<template>
	<view class="login">
		<view class="app_top">
			<view class="welcome animated bounceIn">
				<view class="desc">您好,</view>
				<view class="desc">欢迎来到天保物流</view>
			</view>
			<image src="../../static/images/my.png" mode="widthFix" class="img"></image>
		</view>
		<view class="dk animated fadeInDown">
			<view class="bg">
				<text class="icon">&#xe8b9;</text>
				<input type="number" v-model="item.phone" maxlength="11" placeholder="请输入手机号" />
			</view>
			<view class="bg">
				<text class="icon">&#xe8b2;</text>
				<input :password="show" v-model="item.password" placeholder="请输入密码" />
				<view class="label"><view class="icon" :class="{ active: !show }" @click="show = !show">&#xe7a6;</view></view>
			</view>
			<view class="xy">
				<u-checkbox-group class="checkbox" v-model="item.checked">
					<u-checkbox size="15" shape="circle" label="我已阅读并同意" labelSize="13" name="true"></u-checkbox>
				</u-checkbox-group>
				<text class="a" @click="go('/pages/login/userAgreement?id=1')">《用户协议》</text>
				<text>和</text>
				<text class="a" @click="go('/pages/login/userAgreement?id=2')">《隐私政策》</text>
			</view>
			<button class="btn" @click="submit()">登录</button>
			<button class="btn register" @click="go('/pages/login/chooseRole')">注册</button>
		</view>
	</view>
</template>

<script>
export default {
	data() {
		return {
			show: true,
			item: {phone:'',password:'',checked:[]}
		};
	},
	onLoad() {
		//自动登陆
		if (uni.getStorageSync('token')) {
			uni.switchTab({ url: '/pages/index/index' });
			return;
		}
		//获取版本号和设备信息
		uni.getSystemInfo({
			success: res => {
				this.item.deviceMode = res.model + ' ' + res.system;
				// #ifdef APP-PLUS
				plus.runtime.getProperty(plus.runtime.appid, wgtinfo => {
					this.item.appVersion = wgtinfo.versionCode;
				});
				// #endif
				// #ifdef H5
				this.item.appVersion = '1.0.0';
				// #endif
			}
		});
	},
	methods: {
		toFaceLogin(){
			if(this.item.checked.length==0){
				this.common.toast('请同意并勾选协议');
				return;
			}
			this.common.to('/pages/login/faceLogin');
		},
		submit() {
			let rule = [
				{ name: 'phone', checkType: 'notnull', errorMsg: '手机号不能为空' },
				{ name: 'phone', checkType: 'phoneno', errorMsg: '请输入正确的手机号' },
				{ name: 'password', checkType: 'notnull', errorMsg: '请输入密码' },
				{ name: 'checked', checkType: 'notnull', errorMsg: '请同意并勾选协议' }
			];
			if (!this.verify.check(this.item, rule)) {
				uni.showModal({ content: this.verify.error, showCancel: false });
				return false;
			}
			let item = JSON.parse(JSON.stringify(this.item));
			item.phone = this.util.encrypt(this.item.phone);
			item.password = this.util.encrypt(this.item.password);
			this.http.request({
				url: '/sp-admin/app/AppUser/login',
				data: item,
				method: 'POST',
				success: res => {
					let data = res.data.data;
					uni.setStorageSync('token', data.tokenInfo.tokenValue);
					uni.setStorageSync('info', data.appUser);
					uni.setStorageSync('menu', data.per_list);
					uni.showToast({ title: '登录成功' });
					setTimeout(() => {
						uni.$emit('getMenu');
						uni.switchTab({ url: '/pages/index/index' });
					}, 1000);
				}
			});
		},
		go(url) {
			uni.navigateTo({ url: url });
		}
	}
};
</script>

<style lang="scss"></style>
